Pedestals Calib 8586.1

-1

0

1

260 280 300 320 Hut 2.3.3

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.4

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.5

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.6

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.7

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.8

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.9

HI gain 0.0 LO gain 0.0

0 25 50

400 450 500 Hut 2.3.10

HI gain 461.4 LO gain 398.4

-1

0

1

260 280 300 320

Hut 2.3.11

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.12

HI gain 0.0 LO gain 0.0

Pedestals Calib 8586.1

-1

0

1

260 280 300 320

Hut 2.3.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.14

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.3

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.4

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.5

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.6

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.7

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.8

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.9

HI gain 0.0 LO gain 0.0

0

50

450 500 550 Hut 2.4.10

HI gain 532.5 LO gain 485.2

Pedestals Calib 8586.1

-1

0

1

260 280 300 320

Hut 2.4.11

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.12

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320

Hut 2.4.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.14

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.5.3

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.5.4

HI gain 0.0 LO gain 0.0

0

50

100

260 280 300

Hut 2.5.5

HI gain 0.0 LO gain 466.3

0

50

260 280 300

Hut 2.5.6

HI gain 0.0 LO gain 477.6

0 50 100

260 280 300 320 Hut 2.5.7

HI gain 0.0 LO gain 515.3

0 50 100

260 280 300 320 Hut 2.5.8

HI gain 0.0 LO gain 496.9

Pedestals Calib 8586.1

0

20

260 270 280 290 Hut 2.5.9

HI gain 0.0 LO gain 444.8

0

50

100

400 450 500 Hut 2.5.10

HI gain 482.3 LO gain 447.7

0 50 100

275 300 325 350 Hut 2.6.3

HI gain 0.0 LO gain 565.5

0

50

100

260 280 300 Hut 2.6.4

HI gain 0.0 LO gain 470.6

0

50

100

275 300 325 350 Hut 2.6.5

HI gain 0.0 LO gain 593.6

0

50

100

275 300 325 350 Hut 2.6.6

HI gain 0.0 LO gain 555.4

0

50

100

260 270 280 290 Hut 2.6.7

HI gain 0.0 LO gain 435.4

0

50

100

260 280 300 320 Hut 2.6.8

HI gain 0.0 LO gain 507.1

0 50 100

260 280 300

Hut 2.6.9

HI gain 0.0 LO gain 480.4

0

50

400 450 500 Hut 2.6.10

HI gain 458.7 LO gain 447.1

Pedestals Calib 8586.1

-1

0

1

260 280 300 320

Hut 2.6.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.6.14

HI gain 0.0 LO gain 0.0

0

50

100

260 270 280 290 Hut 2.7.3

HI gain 0.0 LO gain 446.8

0

50

100

260 280 300 320 Hut 2.7.4

HI gain 0.0 LO gain 493.5

0

50

100

260 280 300 320 Hut 2.7.5

HI gain 0.0 LO gain 497.6

0

50

100

260 280 300 320 Hut 2.7.6

HI gain 0.0 LO gain 505.4

0

50

260 270 280 290 Hut 2.7.7

HI gain 0.0 LO gain 435.9

0 50 100

260 280 300 320 340 Hut 2.7.8

HI gain 0.0 LO gain 550.7

0 25 50

260 280 300

Hut 2.7.9

HI gain 0.0 LO gain 473.1

0

50

100

450 500 550 Hut 2.7.10

HI gain 466.8 LO gain 524.1

Pedestals Calib 8586.1

-1

0

1

260 280 300 320

Hut 2.7.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.7.14

HI gain 0.0 LO gain 0.0

0

50

260 280 300

Hut 2.8.3

HI gain 0.0 LO gain 466.1

0

50

100

260 280 300

Hut 2.8.4

HI gain 0.0 LO gain 484.5

0 25 50

275 300 325 350 Hut 2.8.5

HI gain 0.0 LO gain 573.1

0

50

260 280 300 320 Hut 2.8.6

HI gain 0.0 LO gain 522.2

0

50

260 280 300 320 340 Hut 2.8.7

HI gain 0.0 LO gain 544.5

0 25 50

260 280 300 320 Hut 2.8.8

HI gain 0.0 LO gain 498.5

0

50

300 350 Hut 2.8.9

HI gain 0.0 LO gain 622.8

0

50

100

500 550 600 Hut 2.8.10

HI gain 545.5 LO gain 579.5

Pedestals Calib 8586.1

0

50

260 280 300 320 Hut 2.9.3

HI gain 0.0 LO gain 512.6

0

50

275 300 325 350 Hut 2.9.4

HI gain 0.0 LO gain 562.9

0 25 50

260 270 280 290 Hut 2.9.5

HI gain 0.0 LO gain 438.8

0 25 50

275 300 325 350 Hut 2.9.6

HI gain 0.0 LO gain 551.9

0

50

260 280 300

Hut 2.9.7

HI gain 0.0 LO gain 459.7

0

50

260 280 300 320 Hut 2.9.8

HI gain 0.0 LO gain 489.8

0

50

400 450 500 Hut 2.9.9

HI gain 482.2 LO gain 416.0

0

50

400 450 500 Hut 2.10.4

HI gain 433.5 LO gain 504.2

0 25 50

500 550 600

Hut 2.10.5

HI gain 517.7 LO gain 592.8

0

50

450 500 550 Hut 2.10.6

HI gain 503.5 LO gain 514.0

Pedestals Calib 8586.1

0

50

100

450 500 550 Hut 2.10.7

HI gain 499.5 LO gain 484.6

0

50

400 450 500 Hut 2.10.8

HI gain 498.5 LO gain 447.1

0

50

100

500 550 600 Hut 2.10.9

HI gain 544.4 LO gain 535.0

0 25 50

400 450 500 Hut 2.11.3

HI gain 415.0 LO gain 455.0

0

50

450 500 550 Hut 2.11.4

HI gain 498.2 LO gain 549.7

0 25 50

350 400 450 Hut 2.11.5

HI gain 492.2 LO gain 308.7

0

50

450 500 550

Hut 2.11.6

HI gain 530.3 LO gain 483.7

-1

0

1

260 280 300 320 Hut 2.11.7

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320

Hut 2.11.8

HI gain 0.0 LO gain 0.0

0 25 50

400 450 500 Hut 2.12.3

HI gain 460.8 LO gain 418.0

Pedestals Calib 8586.1

0 25 50

500 550 600 Hut 2.12.4

HI gain 547.8 LO gain 583.3

0 25 50

450 500 550 Hut 2.12.5

HI gain 463.2 LO gain 526.6

0 25 50

400 450 500 Hut 2.12.6

HI gain 473.1 LO gain 466.8

0

50

100

260 280 300 Hut 2.12.7

HI gain 0.0 LO gain 486.7

-1

0

1

260 280 300 320

Hut 2.12.8

HI gain 0.0 LO gain 0.0

0 25 50

500 550 600 Hut 2.13.3

HI gain 454.5 LO gain 609.9

0

50

500 550 600 Hut 2.13.4

HI gain 519.1 LO gain 613.7

0

50

500 550 600 Hut 2.13.5

HI gain 484.8 LO gain 604.2

0 50 100

450 500 550 Hut 2.13.6

HI gain 416.8 LO gain 575.5

0

50

300 350 400 Hut 2.13.7

HI gain 387.0 LO gain 331.9

Pedestals Calib 8586.1

0

50

100

350 400 450 Hut 2.13.8

HI gain 407.6 LO gain 424.5

0

50

400 450 500 Hut 2.14.3

HI gain 428.1 LO gain 491.4

0 25 50

500 550 600 Hut 2.14.4

HI gain 554.2 LO gain 534.7

0 20 40

350 400 450 Hut 2.14.5

HI gain 340.4 LO gain 467.2

0

20

40

500 550 600 Hut 2.14.6

HI gain 567.8 LO gain 497.2

0

50

300 350 400 Hut 2.14.7

HI gain 320.0 LO gain 384.7

0

50

100

300 350 400 Hut 2.14.8

HI gain 357.8 LO gain 383.8

LP calibrations Calib 8586.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1066. 39.31

Hut 2.3.3 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1066. 39.31

Hut 2.3.3

Hut 2.3.3 TDC counts

Events

HImean = 3449.2 LOmean = 3489.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1332. 138.6

Hut 2.3.4 TDC counts

Events

0

100

1300 1350 1400

Entries Mean RMS 800 1332. 138.6

Hut 2.3.4

Hut 2.3.4 TDC counts

Events

HImean = 3596.3 LOmean = 3601.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1067. 107.1

Hut 2.3.5 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1067. 107.1

Hut 2.3.5

Hut 2.3.5 TDC counts

Events

HImean = 3676.0 LOmean = 3478.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1051. 1.906

Hut 2.3.6 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1051. 1.906

Hut 2.3.6

Hut 2.3.6 TDC counts

Events

HImean = 3543.6 LOmean = 3010.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1012. 109.8

Hut 2.3.7 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1012. 109.8

Hut 2.3.7

Hut 2.3.7 TDC counts

Events

HImean = 3407.8 LOmean = 3099.4

LP calibrations Calib 8586.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1144. 104.5

Hut 2.3.8 TDC counts

Events

0

100

200

1100 1150 1200

Entries Mean RMS 800 1144. 104.5

Hut 2.3.8

Hut 2.3.8 TDC counts

Events

HImean = 3651.8 LOmean = 3266.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1550. 145.4

Hut 2.3.9 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1550. 145.4

Hut 2.3.9

Hut 2.3.9 TDC counts

Events

HImean = 3355.7 LOmean = 3285.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2215. 27.87

Hut 2.3.10 TDC counts

Events

0

100

2200 2250 2300

Entries Mean RMS 800 2215. 27.87

Hut 2.3.10

Hut 2.3.10 TDC counts

Events

HImean = 1313.7 LOmean = 1169.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 586.6 124.3

Hut 2.3.11 TDC counts

Events

0

100

550 600 650

Entries Mean RMS 800 586.6 124.3

Hut 2.3.11

Hut 2.3.11 TDC counts

Events

HImean = 3490.8 LOmean = 2949.1

0 50 100 150

0 1000 2000 3000 4000

Entries Mean RMS 800 926.8 34.96

Hut 2.3.12 TDC counts

Events

0 50 100 150

900 950 1000

Entries Mean RMS 800 926.8 34.96

Hut 2.3.12

Hut 2.3.12 TDC counts

Events

HImean = 4041.9 LOmean = 3024.5

LP calibrations Calib 8586.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 696.0 15.29

Hut 2.3.13 TDC counts

Events

0

100

650 700 750

Entries Mean RMS 800 696.0 15.29

Hut 2.3.13

Hut 2.3.13 TDC counts

Events

HImean = 3114.9 LOmean = 2589.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 805.7 116.4

Hut 2.3.14 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 805.7 116.4

Hut 2.3.14

Hut 2.3.14 TDC counts

Events

HImean = 3709.1 LOmean = 2738.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1126. 6.372

Hut 2.4.3 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1126. 6.372

Hut 2.4.3

Hut 2.4.3 TDC counts

Events

HImean = 3267.6 LOmean = 3303.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1440. 17.59

Hut 2.4.4 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1440. 17.59

Hut 2.4.4

Hut 2.4.4 TDC counts

Events

HImean = 3486.0 LOmean = 3455.6

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1354. 97.02

Hut 2.4.5 TDC counts

Events

0

100

200

1350 1400 1450

Entries Mean RMS 800 1354. 97.02

Hut 2.4.5

Hut 2.4.5 TDC counts

Events

HImean = 3665.5 LOmean = 3429.5

LP calibrations Calib 8586.1

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.6 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.6

Hut 2.4.6 TDC counts

Events

HImean = 2582.1 LOmean = 2550.1

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.7 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.7

Hut 2.4.7 TDC counts

Events

HImean = 2492.4 LOmean = 2552.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1034. 188.2

Hut 2.4.8 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1034. 188.2

Hut 2.4.8

Hut 2.4.8 TDC counts

Events

HImean = 3331.8 LOmean = 3489.9

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1050. 2.640

Hut 2.4.9 TDC counts

Events

0

100

200

1000 1050 1100 1150

Entries Mean RMS 800 1050. 2.640

Hut 2.4.9

Hut 2.4.9 TDC counts

Events

HImean = 4003.9 LOmean = 3574.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 697.4 120.2

Hut 2.4.10 TDC counts

Events

0

100

700 750 800

Entries Mean RMS 800 697.4 120.2

Hut 2.4.10

Hut 2.4.10 TDC counts

Events

HImean = 1175.7 LOmean = 1438.2

LP calibrations Calib 8586.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 642.8 174.7

Hut 2.4.11 TDC counts

Events

0

100

600 650 700

Entries Mean RMS 800 642.8 174.7

Hut 2.4.11

Hut 2.4.11 TDC counts

Events

HImean = 2821.0 LOmean = 2605.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 870.3 114.3

Hut 2.4.12 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 870.3 114.3

Hut 2.4.12

Hut 2.4.12 TDC counts

Events

HImean = 2680.0 LOmean = 2626.8

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 786.3 83.21

Hut 2.4.13 TDC counts

Events

0

100

200

750 800 850

Entries Mean RMS 800 786.3 83.21

Hut 2.4.13

Hut 2.4.13 TDC counts

Events

HImean = 3874.5 LOmean = 4095.5

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.14 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.14

Hut 2.4.14 TDC counts

Events

HImean = 2688.4 LOmean = 2654.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1225. 106.1

Hut 2.5.3 TDC counts

Events

0

100

1200 1250 1300

Entries Mean RMS 800 1225. 106.1

Hut 2.5.3

Hut 2.5.3 TDC counts

Events

HImean = 3508.6 LOmean = 3347.4

LP calibrations Calib 8586.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1309. 98.61

Hut 2.5.4 TDC counts

Events

0

100

1300 1350 1400

Entries Mean RMS 800 1309. 98.61

Hut 2.5.4

Hut 2.5.4 TDC counts

Events

HImean = 3439.4 LOmean = 3373.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1129. 211.3

Hut 2.5.5 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1129. 211.3

Hut 2.5.5

Hut 2.5.5 TDC counts

Events

HImean = 3303.1 LOmean = 1322.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1144. 104.5

Hut 2.5.6 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1144. 104.5

Hut 2.5.6

Hut 2.5.6 TDC counts

Events

HImean = 3630.6 LOmean = 1261.7

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1149. 28.97

Hut 2.5.7 TDC counts

Events

0

100

200

1100 1150 1200 1250

Entries Mean RMS 800 1149. 28.97

Hut 2.5.7

Hut 2.5.7 TDC counts

Events

HImean = 3369.1 LOmean = 804.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1069. 152.0

Hut 2.5.8 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1069. 152.0

Hut 2.5.8

Hut 2.5.8 TDC counts

Events

HImean = 3298.4 LOmean = 1247.7

LP calibrations Calib 8586.1

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2117. 1103.

Hut 2.5.9 TDC counts

Events

0

1

2050 2100 2150

Entries Mean RMS 800 2117. 1103.

Hut 2.5.9

Hut 2.5.9 TDC counts

Events

HImean = 3273.3 LOmean = 4095.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 714.1 6.431

Hut 2.5.10 TDC counts

Events

0

100

700 750 800

Entries Mean RMS 800 714.1 6.431

Hut 2.5.10

Hut 2.5.10 TDC counts

Events

HImean = 1006.5 LOmean = 1279.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1358. 96.90

Hut 2.6.3 TDC counts

Events

0

100

1350 1400 1450

Entries Mean RMS 800 1358. 96.90

Hut 2.6.3

Hut 2.6.3 TDC counts

Events

HImean = 3376.3 LOmean = 1267.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 851.7 164.8

Hut 2.6.4 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 851.7 164.8

Hut 2.6.4

Hut 2.6.4 TDC counts

Events

HImean = 3331.7 LOmean = 1367.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1057. 18.19

Hut 2.6.5 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1057. 18.19

Hut 2.6.5

Hut 2.6.5 TDC counts

Events

HImean = 3284.1 LOmean = 1085.5

LP calibrations Calib 8586.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1014. 154.3

Hut 2.6.6 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1014. 154.3

Hut 2.6.6

Hut 2.6.6 TDC counts

Events

HImean = 3192.9 LOmean = 1154.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1161. 107.2

Hut 2.6.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1161. 107.2

Hut 2.6.7

Hut 2.6.7 TDC counts

Events

HImean = 3453.3 LOmean = 1132.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1233. 145.0

Hut 2.6.8 TDC counts

Events

0

100

1200 1250 1300

Entries Mean RMS 800 1233. 145.0

Hut 2.6.8

Hut 2.6.8 TDC counts

Events

HImean = 3492.9 LOmean = 1175.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1100. 3.110

Hut 2.6.9 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1100. 3.110

Hut 2.6.9

Hut 2.6.9 TDC counts

Events

HImean = 3189.8 LOmean = 1234.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1628. 2.352

Hut 2.6.10 TDC counts

Events

0

100

1600 1650 1700

Entries Mean RMS 800 1628. 2.352

Hut 2.6.10

Hut 2.6.10 TDC counts

Events

HImean = 1260.6 LOmean = 1388.0

LP calibrations Calib 8586.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1070. 186.3

Hut 2.6.13 TDC counts

Events

0

100

200

1050 1100 1150

Entries Mean RMS 800 1070. 186.3

Hut 2.6.13

Hut 2.6.13 TDC counts

Events

HImean = 3685.5 LOmean = 2930.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 830.6 1.971

Hut 2.6.14 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 830.6 1.971

Hut 2.6.14

Hut 2.6.14 TDC counts

Events

HImean = 3749.9 LOmean = 4021.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1426. 5.262

Hut 2.7.3 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1426. 5.262

Hut 2.7.3

Hut 2.7.3 TDC counts

Events

HImean = 3528.6 LOmean = 1177.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1561. 130.4

Hut 2.7.4 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1561. 130.4

Hut 2.7.4

Hut 2.7.4 TDC counts

Events

HImean = 3529.8 LOmean = 1227.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1061. 2.142

Hut 2.7.5 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1061. 2.142

Hut 2.7.5

Hut 2.7.5 TDC counts

Events

HImean = 3354.3 LOmean = 1164.0

LP calibrations Calib 8586.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1416. 2.466

Hut 2.7.6 TDC counts

Events

0

100

200

1400 1450 1500

Entries Mean RMS 800 1416. 2.466

Hut 2.7.6

Hut 2.7.6 TDC counts

Events

HImean = 3172.6 LOmean = 1222.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1181. 103.2

Hut 2.7.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1181. 103.2

Hut 2.7.7

Hut 2.7.7 TDC counts

Events

HImean = 3384.2 LOmean = 1226.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1577. 95.52

Hut 2.7.8 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1577. 95.52

Hut 2.7.8

Hut 2.7.8 TDC counts

Events

HImean = 3526.7 LOmean = 4095.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1275. 27.78

Hut 2.7.9 TDC counts

Events

0

100

1250 1300 1350

Entries Mean RMS 800 1275. 27.78

Hut 2.7.9

Hut 2.7.9 TDC counts

Events

HImean = 3428.8 LOmean = 1479.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1466. 93.04

Hut 2.7.10 TDC counts

Events

0

100

1450 1500 1550

Entries Mean RMS 800 1466. 93.04

Hut 2.7.10

Hut 2.7.10 TDC counts

Events

HImean = 1185.2 LOmean = 1159.7

LP calibrations Calib 8586.1

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.7.13 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.7.13

Hut 2.7.13 TDC counts

Events

HImean = 2496.0 LOmean = 2503.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 893.6 197.1

Hut 2.7.14 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 893.6 197.1

Hut 2.7.14

Hut 2.7.14 TDC counts

Events

HImean = 3630.2 LOmean = 3019.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1108. 106.2

Hut 2.8.3 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1108. 106.2

Hut 2.8.3

Hut 2.8.3 TDC counts

Events

HImean = 3400.4 LOmean = 1177.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1098. 2.109

Hut 2.8.4 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1098. 2.109

Hut 2.8.4

Hut 2.8.4 TDC counts

Events

HImean = 3364.2 LOmean = 926.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1323. 1.964

Hut 2.8.5 TDC counts

Events

0

100

1300 1350 1400

Entries Mean RMS 800 1323. 1.964

Hut 2.8.5

Hut 2.8.5 TDC counts

Events

HImean = 3821.9 LOmean = 971.7

LP calibrations Calib 8586.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1217. 101.9

Hut 2.8.6 TDC counts

Events

0

100

1200 1250 1300

Entries Mean RMS 800 1217. 101.9

Hut 2.8.6

Hut 2.8.6 TDC counts

Events

HImean = 3453.8 LOmean = 4070.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 898.3 169.8

Hut 2.8.7 TDC counts

Events

0

100

900 950 1000

Entries Mean RMS 800 898.3 169.8

Hut 2.8.7

Hut 2.8.7 TDC counts

Events

HImean = 3456.2 LOmean = 1283.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1179. 103.2

Hut 2.8.8 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1179. 103.2

Hut 2.8.8

Hut 2.8.8 TDC counts

Events

HImean = 3329.0 LOmean = 1143.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1082. 2.244

Hut 2.8.9 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1082. 2.244

Hut 2.8.9

Hut 2.8.9 TDC counts

Events

HImean = 3557.7 LOmean = 1393.9

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 2185. 51.77

Hut 2.8.10 TDC counts

Events

0 50 100

2150 2200 2250

Entries Mean RMS 800 2185. 51.77

Hut 2.8.10

Hut 2.8.10 TDC counts

Events

HImean = 543.7 LOmean = 695.4

LP calibrations Calib 8586.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1030. 2.055

Hut 2.9.3 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1030. 2.055

Hut 2.9.3

Hut 2.9.3 TDC counts

Events

HImean = 3374.0 LOmean = 1224.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1282. 2.071

Hut 2.9.4 TDC counts

Events

0

100

1250 1300 1350

Entries Mean RMS 800 1282. 2.071

Hut 2.9.4

Hut 2.9.4 TDC counts

Events

HImean = 3331.1 LOmean = 1085.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1116. 149.2

Hut 2.9.5 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1116. 149.2

Hut 2.9.5

Hut 2.9.5 TDC counts

Events

HImean = 3376.6 LOmean = 2436.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1365. 136.7

Hut 2.9.6 TDC counts

Events

0

100

200

1350 1400 1450

Entries Mean RMS 800 1365. 136.7

Hut 2.9.6

Hut 2.9.6 TDC counts

Events

HImean = 3583.3 LOmean = 2793.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1177. 2.200

Hut 2.9.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1177. 2.200

Hut 2.9.7

Hut 2.9.7 TDC counts

Events

HImean = 3473.3 LOmean = 944.3

LP calibrations Calib 8586.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 966.7 110.8

Hut 2.9.8 TDC counts

Events

0

100

950 1000 1050

Entries Mean RMS 800 966.7 110.8

Hut 2.9.8

Hut 2.9.8 TDC counts

Events

HImean = 3583.9 LOmean = 1597.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1407. 45.79

Hut 2.9.9 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1407. 45.79

Hut 2.9.9

Hut 2.9.9 TDC counts

Events

HImean = 1464.5 LOmean = 1193.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1153. 301.0

Hut 2.10.4 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1153. 301.0

Hut 2.10.4

Hut 2.10.4 TDC counts

Events

HImean = 1340.7 LOmean = 1296.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 993.4 3.767

Hut 2.10.5 TDC counts

Events

0

100

200

950 1000 1050

Entries Mean RMS 800 993.4 3.767

Hut 2.10.5

Hut 2.10.5 TDC counts

Events

HImean = 1310.2 LOmean = 1297.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 891.5 160.5

Hut 2.10.6 TDC counts

Events

0

100

850 900 950 1000

Entries Mean RMS 800 891.5 160.5

Hut 2.10.6

Hut 2.10.6 TDC counts

Events

HImean = 1431.3 LOmean = 1265.8

LP calibrations Calib 8586.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 750.7 205.2

Hut 2.10.7 TDC counts

Events

0

100

750 800 850

Entries Mean RMS 800 750.7 205.2

Hut 2.10.7

Hut 2.10.7 TDC counts

Events

HImean = 838.9 LOmean = 2250.7

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4029. 341.9

Hut 2.10.8 TDC counts

Events

0

500

4000 4025 4050 4075 4100

Entries Mean RMS 800 4029. 341.9

Hut 2.10.8

Hut 2.10.8 TDC counts

Events

HImean = 503.9 LOmean = 460.1

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.10.9 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.10.9

Hut 2.10.9 TDC counts

Events

HImean = 561.5 LOmean = 547.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1413. 213.4

Hut 2.11.3 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1413. 213.4

Hut 2.11.3

Hut 2.11.3 TDC counts

Events

HImean = 1365.6 LOmean = 1013.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1176. 150.9

Hut 2.11.4 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1176. 150.9

Hut 2.11.4

Hut 2.11.4 TDC counts

Events

HImean = 1394.6 LOmean = 1329.2

LP calibrations Calib 8586.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 978.8 313.6

Hut 2.11.5 TDC counts

Events

0

100

950 1000 1050

Entries Mean RMS 800 978.8 313.6

Hut 2.11.5

Hut 2.11.5 TDC counts

Events

HImean = 1055.9 LOmean = 987.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 768.6 291.1

Hut 2.11.6 TDC counts

Events

-1

0

1

800 850 900

Entries Mean RMS 800 768.6 291.1

Hut 2.11.6

Hut 2.11.6 TDC counts

Events

HImean = 1390.6 LOmean = 1079.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 698.7 170.1

Hut 2.11.7 TDC counts

Events

0

100

700 750 800

Entries Mean RMS 800 698.7 170.1

Hut 2.11.7

Hut 2.11.7 TDC counts

Events

HImean = 3111.6 LOmean = 2665.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 844.9 162.7

Hut 2.11.8 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 844.9 162.7

Hut 2.11.8

Hut 2.11.8 TDC counts

Events

HImean = 3567.9 LOmean = 2829.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 921.1 251.8

Hut 2.12.3 TDC counts

Events

0

100

200

900 950 1000

Entries Mean RMS 800 921.1 251.8

Hut 2.12.3

Hut 2.12.3 TDC counts

Events

HImean = 1387.6 LOmean = 1167.8

LP calibrations Calib 8586.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 820.3 202.7

Hut 2.12.4 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 820.3 202.7

Hut 2.12.4

Hut 2.12.4 TDC counts

Events

HImean = 1385.5 LOmean = 1309.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 784.7 237.1

Hut 2.12.5 TDC counts

Events

0

100

750 800 850

Entries Mean RMS 800 784.7 237.1

Hut 2.12.5

Hut 2.12.5 TDC counts

Events

HImean = 1396.2 LOmean = 1235.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1097. 2.169

Hut 2.12.6 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1097. 2.169

Hut 2.12.6

Hut 2.12.6 TDC counts

Events

HImean = 1241.2 LOmean = 1719.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 664.3 173.1

Hut 2.12.7 TDC counts

Events

0

100

650 700 750

Entries Mean RMS 800 664.3 173.1

Hut 2.12.7

Hut 2.12.7 TDC counts

Events

HImean = 3744.3 LOmean = 643.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 867.7 58.28

Hut 2.12.8 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 867.7 58.28

Hut 2.12.8

Hut 2.12.8 TDC counts

Events

HImean = 3558.2 LOmean = 2655.3

LP calibrations Calib 8586.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 815.2 232.8

Hut 2.13.3 TDC counts

Events

0

100

200

800 850 900

Entries Mean RMS 800 815.2 232.8

Hut 2.13.3

Hut 2.13.3 TDC counts

Events

HImean = 1348.3 LOmean = 1375.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1519. 130.3

Hut 2.13.4 TDC counts

Events

0

100

1500 1550 1600

Entries Mean RMS 800 1519. 130.3

Hut 2.13.4

Hut 2.13.4 TDC counts

Events

HImean = 1405.3 LOmean = 1378.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 626.5 25.35

Hut 2.13.5 TDC counts

Events

0

100

600 650 700

Entries Mean RMS 800 626.5 25.35

Hut 2.13.5

Hut 2.13.5 TDC counts

Events

HImean = 1419.8 LOmean = 1297.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 805.6 1.904

Hut 2.13.6 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 805.6 1.904

Hut 2.13.6

Hut 2.13.6 TDC counts

Events

HImean = 1363.7 LOmean = 1245.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1197. 107.4

Hut 2.13.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1197. 107.4

Hut 2.13.7

Hut 2.13.7 TDC counts

Events

HImean = 593.4 LOmean = 344.1

LP calibrations Calib 8586.1

0

50

0 1000 2000 3000 4000

Entries Mean RMS 800 973.2 116.7

Hut 2.13.8 TDC counts

Events

0

50

950 1000 1050

Entries Mean RMS 800 973.2 116.7

Hut 2.13.8

Hut 2.13.8 TDC counts

Events

HImean = 983.0 LOmean = 507.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 930.3 2.961

Hut 2.14.3 TDC counts

Events

0

100

200

900 950 1000

Entries Mean RMS 800 930.3 2.961

Hut 2.14.3

Hut 2.14.3 TDC counts

Events

HImean = 1278.1 LOmean = 1215.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1029. 245.3

Hut 2.14.4 TDC counts

Events

0

100

200

1000 1050 1100

Entries Mean RMS 800 1029. 245.3

Hut 2.14.4

Hut 2.14.4 TDC counts

Events

HImean = 1667.0 LOmean = 1767.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 876.0 114.4

Hut 2.14.5 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 876.0 114.4

Hut 2.14.5

Hut 2.14.5 TDC counts

Events

HImean = 1203.4 LOmean = 4023.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 960.7 315.3

Hut 2.14.6 TDC counts

Events

-1

0

1

950 1000 1050

Entries Mean RMS 800 960.7 315.3

Hut 2.14.6

Hut 2.14.6 TDC counts

Events

HImean = 1448.7 LOmean = 2410.8

LP calibrations Calib 8586.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1182. 47.59

Hut 2.14.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1182. 47.59

Hut 2.14.7

Hut 2.14.7 TDC counts

Events

HImean = 1480.5 LOmean = 2833.7

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1159. 147.1

Hut 2.14.8 TDC counts

Events

0

50

100

1150 1200 1250

Entries Mean RMS 800 1159. 147.1

Hut 2.14.8

Hut 2.14.8 TDC counts

Events

HImean = 1002.4 LOmean = 469.4

TDC calibrations Calib 8586.1

0 2500

5000

10 20 30

11.92 / 15 P1 273.7 P2 151.9

icalid

(TDC counts)

Hut 2.3.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.3

Hut 2.3.3 icalid

Δfit (TDC counts)

0.164531 ns/TDCcount

0 2500

5000

10 20 30

7.700 / 14 P1 472.0 P2 156.1

icalid

(TDC counts)

Hut 2.3.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.4

Hut 2.3.4 icalid

Δfit (TDC counts)

0.160205 ns/TDCcount

0 2500

5000

10 20 30

12.71 / 15 P1 227.3 P2 155.8

icalid

(TDC counts)

Hut 2.3.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.5

Hut 2.3.5 icalid

Δfit (TDC counts)

0.160502 ns/TDCcount

0 2500

5000

10 20 30

9.041 / 14 P1 207.2 P2 152.1

icalid

(TDC counts)

Hut 2.3.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.6

Hut 2.3.6 icalid

Δfit (TDC counts)

0.164367 ns/TDCcount

0 2500

5000

10 20 30

16.18 / 14 P1 187.2 P2 157.1

icalid

(TDC counts)

Hut 2.3.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.7

Hut 2.3.7 icalid

Δfit (TDC counts)

0.159155 ns/TDCcount

TDC calibrations Calib 8586.1

0 2500

5000

10 20 30

0.6069E+05/ 14 P1 301.8 P2 155.5

icalid

(TDC counts)

Hut 2.3.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.8

Hut 2.3.8 icalid

Δfit (TDC counts)

0.160793 ns/TDCcount

0 2000

4000

10 20 30

10.04 / 15 P1 28.64 P2 150.8

icalid

(TDC counts)

Hut 2.3.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.9

Hut 2.3.9 icalid

Δfit (TDC counts)

0.165828 ns/TDCcount

0 2500

5000

10 20 30

8.945 / 15 P1 409.5 P2 151.3

icalid

(TDC counts)

Hut 2.3.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.10

Hut 2.3.10 icalid

Δfit (TDC counts)

0.165222 ns/TDCcount

0 2000

4000

10 20 30

0.9817E+06/ 16 P1 293.4 P2 120.0

icalid

(TDC counts)

Hut 2.3.11

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.11

Hut 2.3.11 icalid

Δfit (TDC counts)

0.20841 ns/TDCcount

0

2500

5000

10 20 30

14.28 / 15 P1 149.2 P2 150.9

icalid

(TDC counts)

Hut 2.3.12

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.12

Hut 2.3.12 icalid

Δfit (TDC counts)

0.165711 ns/TDCcount

TDC calibrations Calib 8586.1

0

2000

4000

10 20 30

0.3386E+07/ 16 P1 723.2 P2 93.03

icalid

(TDC counts)

Hut 2.3.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.13

Hut 2.3.13 icalid

Δfit (TDC counts)

0.26872 ns/TDCcount

0 2000

4000

10 20 30

22.88 / 15 P1 32.13 P2 149.3

icalid

(TDC counts)

Hut 2.3.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.14

Hut 2.3.14 icalid

Δfit (TDC counts)

0.16744 ns/TDCcount

0 2500

5000

10 20 30

8.093 / 14 P1 296.5 P2 153.9

icalid

(TDC counts)

Hut 2.4.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.3

Hut 2.4.3 icalid

Δfit (TDC counts)

0.162434 ns/TDCcount

0 2500

5000

10 20 30

5.134 / 14 P1 488.7 P2 158.4

icalid

(TDC counts)

Hut 2.4.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.4

Hut 2.4.4 icalid

Δfit (TDC counts)

0.157805 ns/TDCcount

0 2500

5000

10 20 30

5.727 / 14 P1 481.4 P2 158.0

icalid

(TDC counts)

Hut 2.4.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.5

Hut 2.4.5 icalid

Δfit (TDC counts)

0.158271 ns/TDCcount

TDC calibrations Calib 8586.1

0 2500

5000

10 20 30

3.424 / 13 P1 501.0 P2 158.0

icalid

(TDC counts)

Hut 2.4.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.6

Hut 2.4.6 icalid

Δfit (TDC counts)

0.158252 ns/TDCcount

0 2500

5000

10 20 30

1.253 / 13 P1 357.8 P2 158.3

icalid

(TDC counts)

Hut 2.4.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.7

Hut 2.4.7 icalid

Δfit (TDC counts)

0.157959 ns/TDCcount

0 2500

5000

10 20 30

0.1694E+05/ 14 P1 297.5 P2 155.1

icalid

(TDC counts)

Hut 2.4.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.8

Hut 2.4.8 icalid

Δfit (TDC counts)

0.161165 ns/TDCcount

0 2500

5000

10 20 30

5.456 / 14 P1 336.1 P2 157.2

icalid

(TDC counts)

Hut 2.4.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.9

Hut 2.4.9 icalid

Δfit (TDC counts)

0.159041 ns/TDCcount

0 2000

4000

10 20 30

22.85 / 15 P1 0.6415 P2 151.7

icalid

(TDC counts)

Hut 2.4.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.10

Hut 2.4.10 icalid

Δfit (TDC counts)

0.164824 ns/TDCcount

TDC calibrations Calib 8586.1

0 2000

4000

10 20 30

12.62 / 14 P1 -139.7 P2 152.7

icalid

(TDC counts)

Hut 2.4.11

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.11

Hut 2.4.11 icalid

Δfit (TDC counts)

0.163766 ns/TDCcount

0 2000

4000

10 20 30

7.593 / 14 P1 92.34 P2 150.6

icalid

(TDC counts)

Hut 2.4.12

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.12

Hut 2.4.12 icalid

Δfit (TDC counts)

0.165987 ns/TDCcount

0 2000

4000

10 20 30

0.5974E+05/ 15 P1 -9.212 P2 150.0

icalid

(TDC counts)

Hut 2.4.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.13

Hut 2.4.13 icalid

Δfit (TDC counts)

0.166703 ns/TDCcount

0

2500

5000

10 20 30

7.693 / 14 P1 232.0 P2 150.2

icalid

(TDC counts)

Hut 2.4.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.14

Hut 2.4.14 icalid

Δfit (TDC counts)

0.166431 ns/TDCcount

0 2500

5000

10 20 30

3.907 / 14 P1 258.8 P2 157.3

icalid

(TDC counts)

Hut 2.5.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.3

Hut 2.5.3 icalid

Δfit (TDC counts)

0.158968 ns/TDCcount

TDC calibrations Calib 8586.1

0 2500

5000

10 20 30

0.9398E+05/ 14 P1 501.3 P2 151.2

icalid

(TDC counts)

Hut 2.5.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.4

Hut 2.5.4 icalid

Δfit (TDC counts)

0.165308 ns/TDCcount

0 2500

5000

10 20 30

30.84 / 15 P1 220.1 P2 155.5

icalid

(TDC counts)

Hut 2.5.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.5

Hut 2.5.5 icalid

Δfit (TDC counts)

0.160737 ns/TDCcount

0 2500

5000

10 20 30

14.58 / 15 P1 244.7 P2 154.8

icalid

(TDC counts)

Hut 2.5.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.6

Hut 2.5.6 icalid

Δfit (TDC counts)

0.161544 ns/TDCcount

0 2500

5000

10 20 30

10.96 / 14 P1 253.5 P2 154.9

icalid

(TDC counts)

Hut 2.5.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.7

Hut 2.5.7 icalid

Δfit (TDC counts)

0.161376 ns/TDCcount

0 2500

5000

10 20 30

5.457 / 14 P1 290.6 P2 155.6

icalid

(TDC counts)

Hut 2.5.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.8

Hut 2.5.8 icalid

Δfit (TDC counts)

0.160628 ns/TDCcount

TDC calibrations Calib 8586.1

0

2000

10 20 30

0.3577E+07/ 28 P1 1427. P2 32.32

icalid

(TDC counts)

Hut 2.5.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.9

Hut 2.5.9 icalid

Δfit (TDC counts)

0.773608 ns/TDCcount

0 2000

4000

10 20 30

0.1782E+07/ 16 P1 448.7 P2 116.5

icalid

(TDC counts)

Hut 2.5.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.10

Hut 2.5.10 icalid

Δfit (TDC counts)

0.214664 ns/TDCcount

0 2500

5000

10 20 30

9.831 / 14 P1 498.0 P2 152.6

icalid

(TDC counts)

Hut 2.6.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.3

Hut 2.6.3 icalid

Δfit (TDC counts)

0.163855 ns/TDCcount

0 2000

4000

10 20 30

18.41 / 15 P1 -53.00 P2 152.3

icalid

(TDC counts)

Hut 2.6.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.4

Hut 2.6.4 icalid

Δfit (TDC counts)

0.164162 ns/TDCcount

0 2500

5000

10 20 30

16.94 / 15 P1 244.2 P2 153.9

icalid

(TDC counts)

Hut 2.6.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.5

Hut 2.6.5 icalid

Δfit (TDC counts)

0.162462 ns/TDCcount

TDC calibrations Calib 8586.1

0 2500

5000

10 20 30

15.88 / 14 P1 169.1 P2 154.3

icalid

(TDC counts)

Hut 2.6.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.6

Hut 2.6.6 icalid

Δfit (TDC counts)

0.162062 ns/TDCcount

0 2500

5000

10 20 30

10.61 / 14 P1 318.3 P2 153.7

icalid

(TDC counts)

Hut 2.6.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.7

Hut 2.6.7 icalid

Δfit (TDC counts)

0.162701 ns/TDCcount

0 2000

4000

10 20 30

0.1148E+07/ 16 P1 679.9 P2 127.5

icalid

(TDC counts)

Hut 2.6.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.8

Hut 2.6.8 icalid

Δfit (TDC counts)

0.196018 ns/TDCcount

0 2500

5000

10 20 30

11.88 / 14 P1 348.8 P2 154.9

icalid

(TDC counts)

Hut 2.6.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.9

Hut 2.6.9 icalid

Δfit (TDC counts)

0.161422 ns/TDCcount

0 2500

5000

10 20 30

9.037 / 14 P1 784.6 P2 154.2

icalid

(TDC counts)

Hut 2.6.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.10

Hut 2.6.10 icalid

Δfit (TDC counts)

0.162111 ns/TDCcount

TDC calibrations Calib 8586.1

0 2500

5000

10 20 30

15.61 / 15 P1 281.7 P2 151.8

icalid

(TDC counts)

Hut 2.6.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.13

Hut 2.6.13 icalid

Δfit (TDC counts)

0.164723 ns/TDCcount

0

2500

5000

10 20 30

7.189 / 15 P1 102.5 P2 151.4

icalid

(TDC counts)

Hut 2.6.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.14

Hut 2.6.14 icalid

Δfit (TDC counts)

0.165085 ns/TDCcount

0 2500

5000

10 20 30

6.124 / 14 P1 550.8 P2 155.6

icalid

(TDC counts)

Hut 2.7.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.3

Hut 2.7.3 icalid

Δfit (TDC counts)

0.160633 ns/TDCcount

0 2500

5000

10 20 30

5.137 / 14 P1 682.1 P2 155.8

icalid

(TDC counts)

Hut 2.7.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.4

Hut 2.7.4 icalid

Δfit (TDC counts)

0.160512 ns/TDCcount

0 2500

5000

10 20 30

7.135 / 14 P1 319.0 P2 156.0

icalid

(TDC counts)

Hut 2.7.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.5

Hut 2.7.5 icalid

Δfit (TDC counts)

0.160291 ns/TDCcount

TDC calibrations Calib 8586.1

0 2500

5000

10 20 30

4.212 / 15 P1 533.3 P2 155.8

icalid

(TDC counts)

Hut 2.7.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.6

Hut 2.7.6 icalid

Δfit (TDC counts)

0.160463 ns/TDCcount

0 2500

5000

10 20 30

8.192 / 14 P1 355.5 P2 156.1

icalid

(TDC counts)

Hut 2.7.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.7

Hut 2.7.7 icalid

Δfit (TDC counts)

0.160134 ns/TDCcount

0 2000

4000

10 20 30

0.4244E+07/ 16 P1 929.6 P2 111.0

icalid

(TDC counts)

Hut 2.7.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.8

Hut 2.7.8 icalid

Δfit (TDC counts)

0.225172 ns/TDCcount

0 2500

5000

10 20 30

177.5 / 14 P1 219.6 P2 154.8

icalid

(TDC counts)

Hut 2.7.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.9

Hut 2.7.9 icalid

Δfit (TDC counts)

0.161484 ns/TDCcount

0 2000

4000

10 20 30

0.9480E+06/ 15 P1 481.2 P2 120.1

icalid

(TDC counts)

Hut 2.7.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.10

Hut 2.7.10 icalid

Δfit (TDC counts)

0.208219 ns/TDCcount

TDC calibrations Calib 8586.1

0 2000

4000

10 20 30

6.151 / 14 P1 61.95 P2 150.8

icalid

(TDC counts)

Hut 2.7.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.13

Hut 2.7.13 icalid

Δfit (TDC counts)

0.165787 ns/TDCcount

0 2000

4000

10 20 30

21.16 / 15 P1 -13.85 P2 150.3

icalid

(TDC counts)

Hut 2.7.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.14

Hut 2.7.14 icalid

Δfit (TDC counts)

0.166324 ns/TDCcount

0 2500

5000

10 20 30

3.312 / 14 P1 282.1 P2 156.7

icalid

(TDC counts)

Hut 2.8.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.3

Hut 2.8.3 icalid

Δfit (TDC counts)

0.159572 ns/TDCcount

0 2500

5000

10 20 30

0.4023E+05/ 15 P1 214.1 P2 153.6

icalid

(TDC counts)

Hut 2.8.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.4

Hut 2.8.4 icalid

Δfit (TDC counts)

0.162723 ns/TDCcount

0 2500

5000

10 20 30

7.443 / 14 P1 453.0 P2 157.0

icalid

(TDC counts)

Hut 2.8.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.5

Hut 2.8.5 icalid

Δfit (TDC counts)

0.159189 ns/TDCcount

TDC calibrations Calib 8586.1

0 2500

5000

10 20 30

3.036 / 14 P1 352.5 P2 156.5

icalid

(TDC counts)

Hut 2.8.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.6

Hut 2.8.6 icalid

Δfit (TDC counts)

0.159793 ns/TDCcount

0

2000

4000

10 20 30

0.2032E+07/ 15 P1 748.3 P2 101.8

icalid

(TDC counts)

Hut 2.8.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.7

Hut 2.8.7 icalid

Δfit (TDC counts)

0.245691 ns/TDCcount

0 2500

5000

10 20 30

8.113 / 15 P1 483.5 P2 150.8

icalid

(TDC counts)

Hut 2.8.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.8

Hut 2.8.8 icalid

Δfit (TDC counts)

0.1658 ns/TDCcount

0 2500

5000

10 20 30

8.016 / 14 P1 263.2 P2 155.4

icalid

(TDC counts)

Hut 2.8.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.9

Hut 2.8.9 icalid

Δfit (TDC counts)

0.160824 ns/TDCcount

0

2500

5000

10 20 30

7.765 / 15 P1 142.9 P2 151.8

icalid

(TDC counts)

Hut 2.8.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.10

Hut 2.8.10 icalid

Δfit (TDC counts)

0.164639 ns/TDCcount

TDC calibrations Calib 8586.1

0 2500

5000

10 20 30

17.70 / 14 P1 195.5 P2 155.8

icalid

(TDC counts)

Hut 2.9.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.3

Hut 2.9.3 icalid

Δfit (TDC counts)

0.160413 ns/TDCcount

0 2500

5000

10 20 30

7.232 / 14 P1 499.5 P2 151.1

icalid

(TDC counts)

Hut 2.9.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.4

Hut 2.9.4 icalid

Δfit (TDC counts)

0.165414 ns/TDCcount

0 2500

5000

10 20 30

13.85 / 15 P1 272.7 P2 152.7

icalid

(TDC counts)

Hut 2.9.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.5

Hut 2.9.5 icalid

Δfit (TDC counts)

0.16374 ns/TDCcount

0 2500

5000

10 20 30

22.56 / 15 P1 544.9 P2 147.4

icalid

(TDC counts)

Hut 2.9.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.6

Hut 2.9.6 icalid

Δfit (TDC counts)

0.169551 ns/TDCcount

0 2500

5000

10 20 30

8.424 / 14 P1 368.5 P2 154.2

icalid

(TDC counts)

Hut 2.9.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.7

Hut 2.9.7 icalid

Δfit (TDC counts)

0.162141 ns/TDCcount

TDC calibrations Calib 8586.1

0 2500

5000

10 20 30

15.54 / 15 P1 272.1 P2 152.4

icalid

(TDC counts)

Hut 2.9.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.8

Hut 2.9.8 icalid

Δfit (TDC counts)

0.164061 ns/TDCcount

0 2000

4000

10 20 30

17.64 / 14 P1 -73.48 P2 150.9

icalid

(TDC counts)

Hut 2.9.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.9

Hut 2.9.9 icalid

Δfit (TDC counts)

0.165662 ns/TDCcount

0

2000

4000

10 20 30

0.2911E+07/ 15 P1 831.9 P2 102.1

icalid

(TDC counts)

Hut 2.10.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.4

Hut 2.10.4 icalid

Δfit (TDC counts)

0.244868 ns/TDCcount

0 2500

5000

10 20 30

9.178 / 15 P1 260.3 P2 151.1

icalid

(TDC counts)

Hut 2.10.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.5

Hut 2.10.5 icalid

Δfit (TDC counts)

0.165507 ns/TDCcount

0 2000

4000

10 20 30

0.3680E+07/ 16 P1 622.6 P2 109.8

icalid

(TDC counts)

Hut 2.10.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.6

Hut 2.10.6 icalid

Δfit (TDC counts)

0.227595 ns/TDCcount

TDC calibrations Calib 8586.1

0 2000

4000

10 20 30

5.810 / 14 P1 77.33 P2 150.9

icalid

(TDC counts)

Hut 2.10.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.7

Hut 2.10.7 icalid

Δfit (TDC counts)

0.165703 ns/TDCcount

0 2000

4000

10 20 30

10.12 / 14 P1 41.32 P2 150.7

icalid

(TDC counts)

Hut 2.10.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.8

Hut 2.10.8 icalid

Δfit (TDC counts)

0.165863 ns/TDCcount

0

2500

5000

10 20 30

8.725 / 14 P1 191.2 P2 151.4

icalid

(TDC counts)

Hut 2.10.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.9

Hut 2.10.9 icalid

Δfit (TDC counts)

0.165088 ns/TDCcount

0 2500

5000

10 20 30

5.856 / 14 P1 634.7 P2 155.4

icalid

(TDC counts)

Hut 2.11.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.3

Hut 2.11.3 icalid

Δfit (TDC counts)

0.160838 ns/TDCcount

0 2000

4000

10 20 30

0.2648E+07/ 16 P1 995.8 P2 100.3

icalid

(TDC counts)

Hut 2.11.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.4

Hut 2.11.4 icalid

Δfit (TDC counts)

0.249294 ns/TDCcount

TDC calibrations Calib 8586.1

0 2500

5000

10 20 30

0.6203E+05/ 15 P1 272.8 P2 151.0

icalid

(TDC counts)

Hut 2.11.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.5

Hut 2.11.5 icalid

Δfit (TDC counts)

0.165593 ns/TDCcount

0

2000

4000

10 20 30

0.2621E+07/ 17 P1 522.2 P2 103.3

icalid

(TDC counts)

Hut 2.11.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.6

Hut 2.11.6 icalid

Δfit (TDC counts)

0.242131 ns/TDCcount

0 2000

4000

10 20 30

0.3717E+05/ 15 P1 -18.00 P2 148.9

icalid

(TDC counts)

Hut 2.11.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.7

Hut 2.11.7 icalid

Δfit (TDC counts)

0.167853 ns/TDCcount

0 2000

4000

10 20 30

8.174 / 14 P1 63.58 P2 150.6

icalid

(TDC counts)

Hut 2.11.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.8

Hut 2.11.8 icalid

Δfit (TDC counts)

0.165998 ns/TDCcount

0

2000

10 20 30

0.5529E+07/ 15 P1 1364. P2 59.10

icalid

(TDC counts)

Hut 2.12.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.3

Hut 2.12.3 icalid

Δfit (TDC counts)

0.423028 ns/TDCcount

TDC calibrations Calib 8586.1

0

2000

10 20 30

0.7715E+07/ 16 P1 1141. P2 67.45

icalid

(TDC counts)

Hut 2.12.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.4

Hut 2.12.4 icalid

Δfit (TDC counts)

0.370621 ns/TDCcount

0 2000

4000

10 20 30

11.15 / 14 P1 40.74 P2 151.8

icalid

(TDC counts)

Hut 2.12.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.5

Hut 2.12.5 icalid

Δfit (TDC counts)

0.164722 ns/TDCcount

0 2500

5000

10 20 30

8.177 / 14 P1 380.5 P2 154.2

icalid

(TDC counts)

Hut 2.12.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.6

Hut 2.12.6 icalid

Δfit (TDC counts)

0.162139 ns/TDCcount

0 2000

4000

10 20 30

16.90 / 14 P1 -100.8 P2 150.5

icalid

(TDC counts)

Hut 2.12.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.7

Hut 2.12.7 icalid

Δfit (TDC counts)

0.166144 ns/TDCcount

0

2500

5000

10 20 30

12.59 / 15 P1 118.8 P2 151.1

icalid

(TDC counts)

Hut 2.12.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.8

Hut 2.12.8 icalid

Δfit (TDC counts)

0.165489 ns/TDCcount

TDC calibrations Calib 8586.1

0 2000

4000

10 20 30

0.7807E+06/ 15 P1 423.7 P2 124.8

icalid

(TDC counts)

Hut 2.13.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.3

Hut 2.13.3 icalid

Δfit (TDC counts)

0.200276 ns/TDCcount

0 2500

5000

10 20 30

8.710 / 14 P1 787.5 P2 155.1

icalid

(TDC counts)

Hut 2.13.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.4

Hut 2.13.4 icalid

Δfit (TDC counts)

0.161196 ns/TDCcount

0

2000

4000

10 20 30

0.2811E+07/ 15 P1 814.9 P2 88.66

icalid

(TDC counts)

Hut 2.13.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.5

Hut 2.13.5 icalid

Δfit (TDC counts)

0.281961 ns/TDCcount

0

2500

5000

10 20 30

9.403 / 14 P1 73.45 P2 152.8

icalid

(TDC counts)

Hut 2.13.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.6

Hut 2.13.6 icalid

Δfit (TDC counts)

0.163622 ns/TDCcount

0 2500

5000

10 20 30

10.66 / 15 P1 410.5 P2 154.0

icalid

(TDC counts)

Hut 2.13.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.7

Hut 2.13.7 icalid

Δfit (TDC counts)

0.162345 ns/TDCcount

TDC calibrations Calib 8586.1

0 2500

5000

10 20 30

7.074 / 14 P1 217.1 P2 153.6

icalid

(TDC counts)

Hut 2.13.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.8

Hut 2.13.8 icalid

Δfit (TDC counts)

0.162778 ns/TDCcount

0 2500

5000

10 20 30

15.24 / 15 P1 235.8 P2 152.6

icalid

(TDC counts)

Hut 2.14.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.3

Hut 2.14.3 icalid

Δfit (TDC counts)

0.163827 ns/TDCcount

0 2000

4000

10 20 30

0.1386E+07/ 16 P1 616.6 P2 120.6

icalid

(TDC counts)

Hut 2.14.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.4

Hut 2.14.4 icalid

Δfit (TDC counts)

0.207338 ns/TDCcount

0 2500

5000

10 20 30

11.14 / 14 P1 198.9 P2 152.0

icalid

(TDC counts)

Hut 2.14.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.5

Hut 2.14.5 icalid

Δfit (TDC counts)

0.164508 ns/TDCcount

0

2000

4000

10 20 30

0.4754E+07/ 17 P1 955.7 P2 87.49

icalid

(TDC counts)

Hut 2.14.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.6

Hut 2.14.6 icalid

Δfit (TDC counts)

0.285743 ns/TDCcount

TDC calibrations Calib 8586.1

0 2500

5000

10 20 30

10.20 / 14 P1 500.5 P2 154.4

icalid

(TDC counts)

Hut 2.14.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.7

Hut 2.14.7 icalid

Δfit (TDC counts)

0.161919 ns/TDCcount

0

2000

4000

10 20 30

0.4845E+07/ 15 P1 1127. P2 84.86

icalid

(TDC counts)

Hut 2.14.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.8

Hut 2.14.8 icalid

Δfit (TDC counts)

0.294594 ns/TDCcount